From f78a0e52306951f8e4031bf6db9fbfba83982fcf Mon Sep 17 00:00:00 2001
From: Christian Soffke <christian.soffke@gmail.com>
Date: Wed, 8 Dec 2021 14:01:39 +0100
Subject: Manual (HTML): fix image aspect ratio and size

Change-Id: If7c680badcb1a493e2a2059d84ea5b154382bad2
---
 manual/configure_rockbox/sound_settings.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'manual/configure_rockbox/sound_settings.tex')

diff --git a/manual/configure_rockbox/sound_settings.tex b/manual/configure_rockbox/sound_settings.tex
index 73885c27aa..d91ffec989 100644
--- a/manual/configure_rockbox/sound_settings.tex
+++ b/manual/configure_rockbox/sound_settings.tex
@@ -263,7 +263,8 @@ change to customise your listening experience.
   The graphic below illustrates how the width of 10kHz band can be adjusted to
   cover a wider (lower Q) or narrower (higher Q) range of frequencies.
 
-  \includegraphics[width=14cm]{configure_rockbox/images/Q_factor.png}
+  \Ifpdfoutput{\includegraphics[width=14cm]{configure_rockbox/images/Q_factor.png}}
+  {\includegraphics{configure_rockbox/images/Q_factor.png}}
 
   \nopt{gigabeats}{In some ways the EQ is similar to the
   \setting{Bass} and \setting{Treble} settings described earlier, but the EQ
-- 
cgit v1.2.3

