From e8c72b68917b064c6ec7b87d46b4ee59faea7ffb Mon Sep 17 00:00:00 2001
From: Alexander Levin <al.le@rockbox.org>
Date: Sun, 9 May 2010 18:33:31 +0000
Subject: Use typographic quotation marks -- correct more places

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25917 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/sound_settings.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/configure_rockbox/sound_settings.tex')

diff --git a/manual/configure_rockbox/sound_settings.tex b/manual/configure_rockbox/sound_settings.tex
index 61b450e761..4828826366 100644
--- a/manual/configure_rockbox/sound_settings.tex
+++ b/manual/configure_rockbox/sound_settings.tex
@@ -497,6 +497,6 @@ The \setting{Release Time} setting sets the recovery time after the signal is
 compressed.  Once the compressor determines that compression is necessary,
 the input signal is reduced appropriately, but the gain isn't allowed to
 immediately return to normal levels.  This is necessary to reduce artifacts
-such as "pumping."  Instead, the gain is allowed to return to normal at the
+such as ``pumping.''  Instead, the gain is allowed to return to normal at the
 chosen rate.  Release Time is the time for the gain to recover by 10~dB.
 }
-- 
cgit v1.2.3

