From e46f40e1747fc8cbfcc6bb0a573c814056f75989 Mon Sep 17 00:00:00 2001
From: Thomas Martitz <kugel@rockbox.org>
Date: Tue, 18 Oct 2011 20:48:41 +0000
Subject: Fix manual build, forgot to add new files.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@30789 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/sleep_timer.tex | 13 +++++++++++++
 1 file changed, 13 insertions(+)
 create mode 100644 manual/configure_rockbox/sleep_timer.tex

(limited to 'manual/configure_rockbox/sleep_timer.tex')

diff --git a/manual/configure_rockbox/sleep_timer.tex b/manual/configure_rockbox/sleep_timer.tex
new file mode 100644
index 0000000000..f9cb76a603
--- /dev/null
+++ b/manual/configure_rockbox/sleep_timer.tex
@@ -0,0 +1,13 @@
+% $Id:$ %
+\item[Sleep Timer:]
+  The \setting{Sleep Timer} powers off your \dap{} after playing for a given
+  time.
+  Shown when the \setting{Sleep Timer} is inactive, it can be set from
+  \setting{Off} to 5 hours in 5 minute steps.
+  While the \setting{Sleep Timer} is reset on boot, the value selected is
+  retained and will be used as the default from then on.
+\item[Cancel Sleep Timer (h:mm):]
+  Shown when the \setting{Sleep Timer} is active, this option disables the
+  current \setting{Sleep Timer}.
+\item[Start Sleep Timer On Boot:]
+  If set, a \setting{Sleep Timer} will be initiated when the device starts.
-- 
cgit v1.2.3

