From f498d53d72007124049cf72ccccf3435abb097fe Mon Sep 17 00:00:00 2001
From: Dominik Riebeling <Dominik.Riebeling@gmail.com>
Date: Sun, 7 Dec 2008 23:00:15 +0000
Subject: Rename h100 manual name "h1xx" to "h100" to be in line with other
 players.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@19361 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/recording_settings.tex | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'manual/configure_rockbox/recording_settings.tex')

diff --git a/manual/configure_rockbox/recording_settings.tex b/manual/configure_rockbox/recording_settings.tex
index 15e0b1f4d2..a0a3743c93 100644
--- a/manual/configure_rockbox/recording_settings.tex
+++ b/manual/configure_rockbox/recording_settings.tex
@@ -47,7 +47,7 @@
    \nopt{sansa}{
     Choose the recording frequency (sample rate).
     \opt{MASCODEC}{48kHz, 44.1kHz, 32kHz, 24kHz, 22.05kHz, 16kHz}
-    \opt{h1xx,h300}{44.1kHz, 22.05kHz and 11.025kHz}
+    \opt{h100,h300}{44.1kHz, 22.05kHz and 11.025kHz}
     \opt{x5}{88.2kHz, 44.1kHz, 22.05kHz and 11.025kHz}
     are available. Higher sample rates use up more disk space, but give better
     sound quality.
@@ -60,7 +60,7 @@
       MPEG v1 for 48, 44.1 and 32\\
       MPEG v2 for 24, 22.05 and 16\\
     }
-    \opt{recorder,recorderv2fm,h1xx}
+    \opt{recorder,recorderv2fm,h100}
       {\note{You cannot change the sample rate for digital recordings.}
     }
    } % nopt e200  
@@ -71,7 +71,7 @@
 
 \section{Source}
   Choose the source of the recording. The options are: 
-  \opt{recorder,recorderv2fm,h1xx}{\setting{SPDIF (digital)}, }%
+  \opt{recorder,recorderv2fm,h100}{\setting{SPDIF (digital)}, }%
   \nopt{ipodnano,ipodvideo}{\setting{Mic}}%
   \nopt{sansa}{, and {\setting{Line In}}}. %
   \opt{radio}{For recording from the radio see \reference{ref:FMradio}.}
@@ -230,7 +230,7 @@
   
 More information can be found at \wikilink{VolumeTriggeredRecording}.
   
-\opt{h1xx,h300}{%
+\opt{h100,h300}{%
   \section{Automatic Gain Control}
     The \setting{Automatic Gain Control} has five different presets for
     automatically controlling the gain while recording.
-- 
cgit v1.2.3

