From beb3b6b039683edb8e58bfc504310386ce4e05cd Mon Sep 17 00:00:00 2001
From: Marc Guay <marcguay@rockbox.org>
Date: Mon, 14 Jul 2008 03:58:19 +0000
Subject: Fix FS#7541 by removing the line-in recording capacity and the manual
 entry for the H10 (and Sansas).  More work needs to be done in this
 department.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@18028 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/recording_settings.tex | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

(limited to 'manual/configure_rockbox/recording_settings.tex')

diff --git a/manual/configure_rockbox/recording_settings.tex b/manual/configure_rockbox/recording_settings.tex
index bb47401196..7ec0e4985e 100644
--- a/manual/configure_rockbox/recording_settings.tex
+++ b/manual/configure_rockbox/recording_settings.tex
@@ -71,8 +71,9 @@
 
 \section{Source}
   Choose the source of the recording. This can be
-  \opt{recorder,recorderv2fm,h1xx}{\setting{SPDIF (digital)},}%
-  \setting{Mic} or \setting{Line In}.
+  \opt{recorder,recorderv2fm,h1xx}{\setting{SPDIF (digital)}, }%
+  \setting{Mic}%
+  \nopt{sansa,IRIVER_H10_PAD}{ or {\setting{Line In}}}. %
   \opt{radio}{For recording from the radio see \reference{ref:FMradio}.}
 
 \section{Channels}
-- 
cgit v1.2.3

