From 1248e9c6de7687ee7bb76e43dcebac2e0575ecc7 Mon Sep 17 00:00:00 2001
From: Andree Buschmann <AndreeBuschmann@t-online.de>
Date: Wed, 14 Apr 2010 20:38:21 +0000
Subject: More work on consistent usage of units in the manual. Use
 non-breaking spaces if applicable.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25649 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/playback_options.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/configure_rockbox/playback_options.tex')

diff --git a/manual/configure_rockbox/playback_options.tex b/manual/configure_rockbox/playback_options.tex
index 3aa22fd950..d9e8e78426 100644
--- a/manual/configure_rockbox/playback_options.tex
+++ b/manual/configure_rockbox/playback_options.tex
@@ -194,7 +194,7 @@ you to configure settings related to audio playback.
         much, so here you can compensate for that. Please note that a
         (large) positive pre-amp setting can cause clipping, unless
         prevent clipping is enabled.  The pre-amp can be set to any
-        decibel (dB) value between -12 dB and +12 dB, in increments of 0.5 dB.
+        decibel (dB) value between -12~dB and +12~dB, in increments of 0.5~dB.
       \end{description}
 
   \section{Track Skip Beep}
-- 
cgit v1.2.3

