From 744051bd65b86b9b6f31809dd073a75c47214a40 Mon Sep 17 00:00:00 2001
From: Martin Arver <martin.arver@gmail.com>
Date: Tue, 28 Feb 2006 16:33:04 +0000
Subject: Clean up of the autogenerated tables. Should probably use scalebox
 and booktabs for the tables in the future.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@8868 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/main.tex | 47 ++++++++++-----------------------------
 1 file changed, 12 insertions(+), 35 deletions(-)

(limited to 'manual/configure_rockbox/main.tex')

diff --git a/manual/configure_rockbox/main.tex b/manual/configure_rockbox/main.tex
index 7e984f4217..7b768b62d7 100644
--- a/manual/configure_rockbox/main.tex
+++ b/manual/configure_rockbox/main.tex
@@ -130,41 +130,18 @@ quality and can be safely left as they are.  For reference, the
 defaults Rockbox uses are:
 
 
-\begin{tabular}[c]{|p{4.5290003cm}|p{1.56cm}|}
-\hline
-{\centering\bfseries\itshape
-Setting 
-\par}
-&
-{\centering\bfseries\itshape
-Value 
-\par}
-\\\hline
-{\centering\upshape
-MDB Strength 
-\par}
-&
-50dB 
-\\\hline
-{\centering\upshape
-MDB Harmonics 
-\par}
-&
-48\% 
-\\\hline
-{\centering\upshape
-MDB Centre Frequency 
-\par}
-&
-60Hz 
-\\\hline
-{\centering\upshape
-MDB Shape 
-\par}
-&
-90Hz
-\\\hline
-\end{tabular}
+\begin{table}[h!]
+  \begin{center}
+    \begin{tabular}{|c|c|}
+      \hline
+      Setting & Value \\\hline
+      MDB Strength & 50dB \\\hline
+      MDB Harmonics & 48\% \\\hline
+      MDB Centre Frequency & 60Hz \\\hline
+      MDB Shape & 90Hz \\\hline
+    \end{tabular}
+  \end{center}
+\end{table}
 
 \end{itemize}
 \end{itemize}
-- 
cgit v1.2.3

