From 35dcf909a1bde15baa89b954a02903d1b8725622 Mon Sep 17 00:00:00 2001
From: Martin Arver <martin.arver@gmail.com>
Date: Wed, 8 Mar 2006 17:58:11 +0000
Subject: Change the tables in the manual (except the plugins) to use booktabs
 instead of the default table commands. Change standard font to Times.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@8961 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/main.tex | 14 ++++++--------
 1 file changed, 6 insertions(+), 8 deletions(-)

(limited to 'manual/configure_rockbox/main.tex')

diff --git a/manual/configure_rockbox/main.tex b/manual/configure_rockbox/main.tex
index 7b768b62d7..5305a0781e 100644
--- a/manual/configure_rockbox/main.tex
+++ b/manual/configure_rockbox/main.tex
@@ -1,5 +1,4 @@
 \chapter{Configuring Rockbox}
-\newpage
 
 \section{Sound Settings}
 {\centering\itshape
@@ -132,13 +131,12 @@ defaults Rockbox uses are:
 
 \begin{table}[h!]
   \begin{center}
-    \begin{tabular}{|c|c|}
-      \hline
-      Setting & Value \\\hline
-      MDB Strength & 50dB \\\hline
-      MDB Harmonics & 48\% \\\hline
-      MDB Centre Frequency & 60Hz \\\hline
-      MDB Shape & 90Hz \\\hline
+    \begin{tabular}{@{}lc@{}}\toprule
+      Setting & Value \\\midrule
+      MDB Strength & 50dB \\
+      MDB Harmonics & 48\% \\
+      MDB Centre Frequency & 60Hz \\
+      MDB Shape & 90Hz \\\bottomrule
     \end{tabular}
   \end{center}
 \end{table}
-- 
cgit v1.2.3

