From e821c031fcaed9159075782f4b8394147c6c80bb Mon Sep 17 00:00:00 2001
From: Nils Wallménius <nils@rockbox.org>
Date: Sat, 5 Jun 2010 12:31:11 +0000
Subject: Remove Jump scroll from the manual too

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@26577 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/display_options.tex | 10 ----------
 1 file changed, 10 deletions(-)

(limited to 'manual/configure_rockbox/display_options.tex')

diff --git a/manual/configure_rockbox/display_options.tex b/manual/configure_rockbox/display_options.tex
index 40f81b381b..a0661a267b 100644
--- a/manual/configure_rockbox/display_options.tex
+++ b/manual/configure_rockbox/display_options.tex
@@ -177,16 +177,6 @@
         Defines the number of pixels the horizontal manual screen scroll should move
         for each step.
     }
-    \opt{player}{
-      \item[Jump Scroll.]
-        This setting makes text scroll a page at a time instead of a character
-        at a time. If set to \setting{One time}, \setting{2}, \setting{3} or
-        \setting{4} it will scroll a line in paged mode that many times and
-        then scroll it a character at a time. If set to \setting{Always} lines
-        will always scroll in paged mode.
-      \item[Jump Scroll Delay.]
-        Controls how long the delay is before a page is scrolled.
-    }
     \item[Paged Scrolling.]
       When set to \setting{Yes} scrolling vertically on pages that surpass the
       screen size will page up/down instead of simply changing lines. This can be
-- 
cgit v1.2.3

