From e4da0c80680cf8c8e763792ba24289a17dd1ba56 Mon Sep 17 00:00:00 2001
From: Alex Parker <rockbox@aeparker.com>
Date: Wed, 23 Mar 2011 21:22:55 +0000
Subject: MAke manuals build again.  Non scrollwheel targets don't have
 \ButtonScrollXX, so use \ActionStdXX instead.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@29636 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/display_options.tex | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'manual/configure_rockbox/display_options.tex')

diff --git a/manual/configure_rockbox/display_options.tex b/manual/configure_rockbox/display_options.tex
index 430d361c57..74b5c07732 100644
--- a/manual/configure_rockbox/display_options.tex
+++ b/manual/configure_rockbox/display_options.tex
@@ -184,16 +184,16 @@
     \nopt{scrollwheel}{
       \item[List Acceleration Start Delay.]
         This setting enables the acceleration of scroll speed in lists when 
-        holding \ButtonScrollUp{} or \ButtonScrollDown{}. When set to 
+        holding \ActionStdPrev{} or \ActionStdNext{}. When set to 
         \setting{Off} the acceleration is disabled. When any other value is set 
         the acceleration will start to accelerate after holding
-        \ButtonScrollUp{} or \ButtonScrollDown{} for the chosen time (in 
+        \ActionStdPrev{} or \ActionStdNext{} for the chosen time (in 
         seconds).
       \item[List Acceleration Speed.]
         This setting controls how fast the scroll speed accelerates. The scroll 
         speed will increase every N seconds. For example, selecting 
         \setting{Speed up every 3s} will increase the scroll speed every 3 
-        seconds while \ButtonScrollUp{} or \ButtonScrollDown{} is held.
+        seconds while \ActionStdPrev{} or \ActionStdNext{} is held.
     }
     \end{description}
 %
-- 
cgit v1.2.3

