From c479b9975d90de77c8471c91d0d3db8513100add Mon Sep 17 00:00:00 2001
From: Thom Johansen <thomj@rockbox.org>
Date: Wed, 13 Feb 2008 13:32:44 +0000
Subject: FS #8340 by David Bishop. Remove contractions from the manual, as
 this seems to be common practice in this format and makes it easier to read
 for non-native english speakers. New manual work should try to adhere to
 this.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16302 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/display_options.tex | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'manual/configure_rockbox/display_options.tex')

diff --git a/manual/configure_rockbox/display_options.tex b/manual/configure_rockbox/display_options.tex
index 16fb15d186..7906d05581 100644
--- a/manual/configure_rockbox/display_options.tex
+++ b/manual/configure_rockbox/display_options.tex
@@ -150,7 +150,7 @@
       line length.
     \opt{HAVE_LCD_BITMAP}{
       \item[Screen Scrolls Out of View:]
-        On lists with long entries that don't fit on the screen using 
+        On lists with long entries that do not fit on the screen using 
         \opt{recorder,recorderv2fm,h1xx,h300}{\ButtonOn+\ButtonRight/
           \ButtonLeft}\opt{ondio}{\ButtonMenu+\ButtonRight/\ButtonLeft}
         the complete content will be scrolled right/left. With this option set to
@@ -239,13 +239,13 @@
       \end{description}
     }
     \item[Default Codepage:]
-      A codepage describes the way extended characters that aren't available
-      within the ASCII character set are encoded. ID3v1 tags don't have a
+      A codepage describes the way extended characters that are not available
+      within the ASCII character set are encoded. ID3v1 tags do not have a
       codepage encoding contained so Rockbox needs to know what encoding has
       been used when generating these tags. This should be ``ISO-8859-1'' but
       to support languages outside Western Europe most applications use
       the setting of your operating system instead. If your operating system
-      uses a different codepage and you're getting garbled extended characters
+      uses a different codepage and you are getting garbled extended characters
       you should adjust this settings. In most cases sticking to
       ``ISO-8859-1'' would be sufficient.
   \end{description}
-- 
cgit v1.2.3

