From b530de0fd914483f9480cf0661bed5c3b6bd6f06 Mon Sep 17 00:00:00 2001
From: Martin Arver <martin.arver@gmail.com>
Date: Tue, 17 Oct 2006 11:28:36 +0000
Subject: Fix some missing/bad references

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@11245 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/display_options.tex | 1 -
 1 file changed, 1 deletion(-)

(limited to 'manual/configure_rockbox/display_options.tex')

diff --git a/manual/configure_rockbox/display_options.tex b/manual/configure_rockbox/display_options.tex
index 0aacce646e..0084e92c32 100755
--- a/manual/configure_rockbox/display_options.tex
+++ b/manual/configure_rockbox/display_options.tex
@@ -226,7 +226,6 @@
   \opt{HAVE_LCD_BITMAP}{
     \item[Peak Meter:]
       The peak meter can be configured with a number of parameters. 
-      (For a description of the peak meter see \reference{sec:peakmeter}.)
       \begin{description}
       \item[Peak Release:]
         This determines how fast the bar shrinks when the music becomes
-- 
cgit v1.2.3

