From a09152b1284d81f5454d6ae0b25081ef59aa5072 Mon Sep 17 00:00:00 2001
From: Szymon Dziok <b0hoon@o2.pl>
Date: Thu, 15 Apr 2010 18:35:41 +0000
Subject: Packard Bell Vibe 500: Add a part of the manual (no plugin keymaps
 yet).

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25652 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/display_options.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'manual/configure_rockbox/display_options.tex')

diff --git a/manual/configure_rockbox/display_options.tex b/manual/configure_rockbox/display_options.tex
index b78a155b82..6d32e44963 100644
--- a/manual/configure_rockbox/display_options.tex
+++ b/manual/configure_rockbox/display_options.tex
@@ -168,7 +168,8 @@
         \opt{ondio}{\ButtonMenu+\ButtonRight/\ButtonLeft}
         \opt{c200,e200,h100,h300,ipod1g2g,ipod3g,ipod4g,ipodcolor,ipodmini,ipodnano,
         ipodnano2g,ipodvideo,x5,mrobe100,gigabeatf,gigabeats,e200v2}
-        {Long \ButtonRight/\ButtonLeft}\opt{h10,h10_5gb}{Long \ButtonRew/\ButtonFF}.
+        {Long \ButtonRight/\ButtonLeft}\opt{h10,h10_5gb}{Long \ButtonRew/\ButtonFF}
+        \opt{vibe500}{Long \ButtonPrev/\ButtonNext}.
         Setting this option to \setting{Yes}
         will keep the list entries at their fixed positions and allow them to be
         scrolled out of view, whereas \setting{No} will only scroll those entries
-- 
cgit v1.2.3

