From 97548f34d767f14de3fafc2333cfeac97ab36151 Mon Sep 17 00:00:00 2001
From: Thomas Martitz <kugel@rockbox.org>
Date: Mon, 24 Aug 2009 00:22:54 +0000
Subject: Move the "Status/Scrollbar" menu to Theme Settings, and add the
 F_THEMESETTING flag to the settings it was missing.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@22486 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/display_options.tex | 27 ---------------------------
 1 file changed, 27 deletions(-)

(limited to 'manual/configure_rockbox/display_options.tex')

diff --git a/manual/configure_rockbox/display_options.tex b/manual/configure_rockbox/display_options.tex
index 7468025ee2..9ea7e4713c 100644
--- a/manual/configure_rockbox/display_options.tex
+++ b/manual/configure_rockbox/display_options.tex
@@ -191,33 +191,6 @@
       screen size will page up/down instead of simply changing lines. This can be
       useful on slow displays.
     \end{description}
-%
-  \opt{lcd_bitmap}{
-    \item[Status/Scrollbar:]
-      Settings related to on screen status display and the scrollbar.
-      \begin{description}
-      \item[Scroll Bar:] Allows you to choose where the vertical scroll bar
-        should appear.
-      \item[Scroll Bar Width:] Allows you to choose the width of the
-        scroll bar (in pixels).  Default value is 6.
-      \item[Status Bar:] Allows you to choose where to display the 
-        statusbar\opt{remote}{ on the main display}. 
-      \opt{remote}{
-        \item[Remote Status Bar:] Allows you to choose where to display the 
-        statusbar on the remote display.
-      }
-      \opt{RECORDER_PAD}{
-       \item[Button Bar:] Enables or disables the button bar prompts for the
-         ``F''-keys at the bottom of the screen.
-      }
-      \item[Volume Display:] Controls whether the volume is displayed as a
-        graphic or a numeric value on the Status Bar. If you select a numeric
-        display, volume is displayed in decibels.  See \reference{ref:volume}
-        for more on the volume setting.
-      \item[Battery Display:] Controls whether the battery charge status is
-        displayed as a graphic or numerical percentage value on the Status Bar.
-      \end{description}
-    }
 %
   \opt{lcd_bitmap}{
     \item[Peak Meter:]
-- 
cgit v1.2.3

