From 6f2613f19925c4764c505583438d7645831d427d Mon Sep 17 00:00:00 2001
From: Marc Guay <marcguay@rockbox.org>
Date: Mon, 7 Jul 2008 13:22:14 +0000
Subject: Cross-reference to 'volume settings' from 'volume display'. 
 Long-standing manual fixme.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@17977 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/display_options.tex | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'manual/configure_rockbox/display_options.tex')

diff --git a/manual/configure_rockbox/display_options.tex b/manual/configure_rockbox/display_options.tex
index 9785ad294a..65e2ddfafa 100644
--- a/manual/configure_rockbox/display_options.tex
+++ b/manual/configure_rockbox/display_options.tex
@@ -29,12 +29,12 @@
       amount of time is determined by the value of the backlight timeout
       setting, but is no less than 5 seconds.
       \opt{backlight_fade}{
-        \item[Backlight fade in:]
+        \item[Backlight Fade In:]
         The amount of time that the backlight will take to fade from off to on
         after a button is pressed. If set to \setting{Off} the backlight will
         turn on immediately, with no fade in. Can also be set to \setting{500ms},
         \setting{1s} or \setting{2s}.
-        \item[Backlight fade out:]
+        \item[Backlight Fade Out:]
         Like Backlight fade in, this controls the amount of time that the
         backlight will take to fade from on to off after a button is pressed. If
         set to \setting{Off} the backlight will turn off immediately, with no
@@ -194,8 +194,8 @@
       }
       \item[Volume Display:] Controls whether the volume is displayed as a
         graphic or a numeric value on the Status Bar. If you select a numeric
-        display, volume is displayed in decibels.
-        \fixme{cross-reference to volume setting.}
+        display, volume is displayed in decibels.  See \reference{ref:volume}
+        for more on the volume setting.
       \item[Battery Display:] Controls whether the battery charge status is
         displayed as a graphic or numerical percentage value on the Status Bar.
       \end{description}
-- 
cgit v1.2.3

