From 63283d244da605e48c0dc18d4bcd7e7f6f90fe9c Mon Sep 17 00:00:00 2001
From: Marianne Arnold <pixelma@rockbox.org>
Date: Thu, 12 Feb 2009 11:32:19 +0000
Subject: Make the reference to the 'Default codepage' setting introduced in
 r18581 actually work - overlooked the change in a different file back then.
 Also remove two tabs in this file.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@19986 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/display_options.tex | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'manual/configure_rockbox/display_options.tex')

diff --git a/manual/configure_rockbox/display_options.tex b/manual/configure_rockbox/display_options.tex
index c5a76e9f0f..9ac4ce837b 100644
--- a/manual/configure_rockbox/display_options.tex
+++ b/manual/configure_rockbox/display_options.tex
@@ -188,8 +188,8 @@
     }
     \item[Paged Scrolling:]
       When set to \setting{Yes} scrolling vertically on pages that surpass the
-	  screen size will page up/down instead of simply changing lines. This can be
-	  useful on slow displays.
+      screen size will page up/down instead of simply changing lines. This can be
+      useful on slow displays.
     \end{description}
 %
   \opt{lcd_bitmap}{
@@ -255,7 +255,7 @@
         into the peak meter.
       \end{description}
     }
-    \item[Default Codepage:]
+    \item[\label{ref:Defaultcodepage}Default Codepage:]
       A codepage describes the way extended characters that are not available
       within the ASCII character set are encoded. ID3v1 tags do not have a
       codepage encoding contained so Rockbox needs to know what encoding has
-- 
cgit v1.2.3

