From 14a8f9a863f5534333df1359822e2f126583d473 Mon Sep 17 00:00:00 2001
From: Paul Sauro <olsroparadise@proton.me>
Date: Thu, 29 Aug 2024 02:22:27 +0200
Subject: Integrate the new option to the theme engine and to the manual

Change-Id: I8890723a37f905727d068e484b841e1ddaf8f98c
---
 manual/configure_rockbox/display_options.tex | 5 +++++
 1 file changed, 5 insertions(+)

(limited to 'manual/configure_rockbox/display_options.tex')

diff --git a/manual/configure_rockbox/display_options.tex b/manual/configure_rockbox/display_options.tex
index e2b5c3eccd..0d42115efe 100755
--- a/manual/configure_rockbox/display_options.tex
+++ b/manual/configure_rockbox/display_options.tex
@@ -198,6 +198,11 @@
       will keep the list entries at their fixed positions and allow them to be
       scrolled out of view, whereas \setting{No} will only scroll those entries
       which surpass the right margin.
+    \item[Disable main menu scrolling]
+      Setting this option to \setting{Yes}
+      will stop all kind of text scrollings while you are laying on the main menu
+      which may greatly help at avoiding visual glitches if you are using a theme
+      that has a lockscreen.
     \item[Screen Scroll Step Size.]
       Defines the number of pixels the horizontal manual screen scroll should move
       for each step.
-- 
cgit v1.2.3

