From 1248e9c6de7687ee7bb76e43dcebac2e0575ecc7 Mon Sep 17 00:00:00 2001
From: Andree Buschmann <AndreeBuschmann@t-online.de>
Date: Wed, 14 Apr 2010 20:38:21 +0000
Subject: More work on consistent usage of units in the manual. Use
 non-breaking spaces if applicable.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@25649 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/display_options.tex | 16 ++++++++--------
 1 file changed, 8 insertions(+), 8 deletions(-)

(limited to 'manual/configure_rockbox/display_options.tex')

diff --git a/manual/configure_rockbox/display_options.tex b/manual/configure_rockbox/display_options.tex
index b4b6b662ab..b78a155b82 100644
--- a/manual/configure_rockbox/display_options.tex
+++ b/manual/configure_rockbox/display_options.tex
@@ -33,14 +33,14 @@
         The amount of time that the backlight will take to fade from off to on
         after a button is pressed. If set to \setting{Off} the backlight will
         turn on immediately, with no fade in. Can also be set to 
-        \setting{500 ms}, \setting{1 s} or \setting{2 s}.
+        \setting{500ms}, \setting{1s} or \setting{2s}.
         \item[Backlight Fade Out.]
         Like Backlight fade in, this controls the amount of time that the
         backlight will take to fade from on to off after a button is pressed. If
         set to \setting{Off} the backlight will turn off immediately, with no
-        fade out. Other valid values: \setting{500 ms}, \setting{1 s},
-        \setting{2 s}, \setting{3 s}, \setting{4 s}, \setting{5 s} or 
-        \setting{10 s}.
+        fade out. Other valid values: \setting{500ms}, \setting{1s},
+        \setting{2s}, \setting{3s}, \setting{4s}, \setting{5s} or 
+        \setting{10s}.
       }
       \opt{backlight_fade_bool}{
         \item[Backlight Fade In.]
@@ -200,10 +200,10 @@
       \item[Peak Release.]
         This determines how fast the bar shrinks when the music becomes
         softer. Lower values make the peak meter look smoother.
-        Expressed in scale units per 10 ms.
+        Expressed in scale units per 10~ms.
       \item[Peak Hold Time.]
         Specifies the time after which the peak indicator will reset.
-        For example, if you set this value to 5 s, the peak indicator displays
+        For example, if you set this value to 5~s, the peak indicator displays
         the loudest volume value that occurred within the last 5 seconds.
         Larger values are useful if you want to find the peak level of a song,
         which might be of interest when copying music from the \dap\ via the
@@ -229,8 +229,8 @@
       \item[Minimum and maximum range.]
         These two options define the full value range that the peak meter
         displays. Recommended values for the \setting{Logarithmic} (dB) setting
-        are {}-40 dB for minimum and 0 dB for maximum. Recommended values
-        for \setting{Linear} display are 0 and 100\%. Note that {}-40 dB is
+        are {}-40~dB for minimum and 0~dB for maximum. Recommended values
+        for \setting{Linear} display are 0 and 100\%. Note that {}-40~dB is
         approximately 1\% in linear value, but if you change the minimum
         setting in linear mode slightly and then change to the dB scale,
         there will be a large change. You can use these values for `zooming'
-- 
cgit v1.2.3

