From 05a7b271ead65f11f818e1d1c91c7f4380526f3d Mon Sep 17 00:00:00 2001
From: Dominik Riebeling <Dominik.Riebeling@gmail.com>
Date: Wed, 10 May 2006 07:33:43 +0000
Subject: fix the screen scroll out of view description (FS#5331 with
 adjustments by me)

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@9899 a1c6a512-1295-4272-9138-f99709370657
---
 manual/configure_rockbox/display_options.tex | 18 ++++++++++++++----
 1 file changed, 14 insertions(+), 4 deletions(-)

(limited to 'manual/configure_rockbox/display_options.tex')

diff --git a/manual/configure_rockbox/display_options.tex b/manual/configure_rockbox/display_options.tex
index 3e7dea1cf2..0af9521878 100755
--- a/manual/configure_rockbox/display_options.tex
+++ b/manual/configure_rockbox/display_options.tex
@@ -137,9 +137,19 @@
       it should use depending of how much it has to scroll left. This setting 
       lets you tell Rockbox where that limit is, expressed in percentage of 
       line length.
-    \item[Screen Scrolls Out of View:] \fixme{tbd}
-    \item[Screen Scroll Step Size:] \fixme{tbd}
-    \item[Paged Scrolling:] \fixme{tbd}
+    \item[Screen Scrolls Out of View:]
+      On lists with long entries that don't fit on the screen using 
+      \opt{recorder,recorderv2fm,h1xx,h300}{\ButtonOn+\ButtonRight/
+        \ButtonLeft}\opt{ondio}{\fixme{tbd}}
+      the complete content will be scrolled right/left. With this option set to
+      \setting{Yes} the lines can scroll out of view. Otherwise the entries
+      will only scroll as far as they align to the margins.
+    \item[Screen Scroll Step Size:]
+      Determines how many pixels the text should advance in every click when
+      scrolling the screen.
+    \item[Paged Scrolling:]
+      When enabled scrolling will page up/down instead of changing lines. This
+      can be useful on slow displays.
     \end{description}
     %
     \opt{recorder,recorderv2fm,ondio,h1xx,h300,ipodnano,ipodcolour,ipodvideo}{
@@ -164,7 +174,7 @@
     \opt{recorder,recorderv2fm,ondio,h1xx,h300,ipodnano,ipodcolour,ipodvideo}{
     \item[Peak Meter:]
       The peak meter can be configured with a number of parameters. 
-      (For a description of the peak meter see page \pageref{ref:Peakmeter}.)
+      (For a description of the peak meter see page \pageref{sec:peakmeter}.)
       \begin{description}
       \item[Peak Release:]
         This determines how fast the bar shrinks when the music becomes 
-- 
cgit v1.2.3

