From 561620331b06c9ac43f5db15b2090523b6967629 Mon Sep 17 00:00:00 2001
From: Tom Ross <midgey@rockbox.org>
Date: Sat, 20 Jan 2007 00:43:50 +0000
Subject: Add some missing things to the X5 manual. Also updated the VU Meter
 screens.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@12078 a1c6a512-1295-4272-9138-f99709370657
---
 manual/appendix/file_formats.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/appendix/file_formats.tex')

diff --git a/manual/appendix/file_formats.tex b/manual/appendix/file_formats.tex
index ec5522885b..88c89ba48f 100644
--- a/manual/appendix/file_formats.tex
+++ b/manual/appendix/file_formats.tex
@@ -19,7 +19,7 @@
     the first file \\
 \includegraphics[width=0.37cm]{appendix/images/icon-rolo.png} 
   & Rockbox firmware & 
-    \opt{player}{\fname{.mod}}\opt{recorder,recorderv2fm,ondiofm,ondiosp}{\fname{.ajz}}\opt{iriver}{\fname{.iriver}}\opt{ipod}{\fname{.ipod}}\opt{sansa}{\fname{.e200}}
+    \opt{player}{\fname{.mod}}\opt{recorder,recorderv2fm,ondiofm,ondiosp}{\fname{.ajz}}\opt{iriver}{\fname{.iriver}}\opt{ipod}{\fname{.ipod}}\opt{iaudio}{\fname{.iaudio}}\opt{sansa}{\fname{.e200}}
   & ROLO will load the new firmware \\
 \includegraphics[width=0.37cm]{appendix/images/icon-wps.png} 
   & While Playing Screen & \fname{.wps} & The new WPS display configuration will be loaded \\
-- 
cgit v1.2.3

