From 23cb6139bdd3c12d0262916583726ad9d49caf67 Mon Sep 17 00:00:00 2001
From: Solomon Peachy <pizza@shaftnet.org>
Date: Tue, 7 Feb 2023 11:23:30 -0500
Subject: SID:  Disable SID on 2MB targets, as cRSID needs a lot of RAM.

Also add a note that SID might not play in realtime on all targets

Change-Id: Ic14b20a7c1427e31e38204ae3ecff6bd235ec1b4
---
 manual/appendix/file_formats.tex | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

(limited to 'manual/appendix/file_formats.tex')

diff --git a/manual/appendix/file_formats.tex b/manual/appendix/file_formats.tex
index 4c12575b2e..c40a7d35ae 100644
--- a/manual/appendix/file_formats.tex
+++ b/manual/appendix/file_formats.tex
@@ -215,15 +215,16 @@
     Atari SAP
         & \fname{.sap}
         & \\
+    \nopt{clipv1,c200v2}{
     Sound Interface Device
         & \fname{.sid}
-        & Progress bar and seek use subtracks instead of seconds.\\
+        & Progress bar and seek use subtracks instead of seconds.\\}
     SPC700
         & \fname{.spc}
         & \\
   \end{rbtabular}
 
-  \note{NSF and VGM might not play in realtime on all devices due to CPU
+  \note{NSF, VGM, and SID might not play in realtime on all devices due to CPU
   performance requirements.}
 
   \subsection{Codec featureset}
-- 
cgit v1.2.3

