From f5fbde03abf43622e7abd0e0ea62b821b8eaef1b Mon Sep 17 00:00:00 2001
From: Martin Arver <martin.arver@gmail.com>
Date: Wed, 24 Jan 2007 19:28:35 +0000
Subject: Remove disk poweroff

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@12105 a1c6a512-1295-4272-9138-f99709370657
---
 manual/appendix/config_file_options.tex | 1 -
 1 file changed, 1 deletion(-)

(limited to 'manual/appendix/config_file_options.tex')

diff --git a/manual/appendix/config_file_options.tex b/manual/appendix/config_file_options.tex
index 75b99d0437..0de643ae70 100644
--- a/manual/appendix/config_file_options.tex
+++ b/manual/appendix/config_file_options.tex
@@ -181,7 +181,6 @@
                     & graphic, numeric  & N/A\\
       font          & /path/filename.fnt & N/A\\
       invert        & on, off           & N/A\\
-      disk poweroff & on, off           & N/A\\
     }%
 
     \opt{SWCODEC}{% This doesn't depend on SWCODEC but using a \nopt here
-- 
cgit v1.2.3

