From be10817e1c09d5a41710435cf6d58deb6dde9301 Mon Sep 17 00:00:00 2001
From: Nick Peskett <rockbox@peskett.co.uk>
Date: Mon, 19 Mar 2012 09:56:38 +0000
Subject: Option to constrain get_next_dir() to directories below
 global_settings.start_directory.

When enabled, if the user has set "Start File Browser Here" (config.cfg:
start directory) to anything other than root and "Auto-Change Directory"
is set to "Yes" or "Random", the directory returned when an auto change
is required will be constrained to the value of "start directory" or below.

Change-Id: Iaab773868c4cab5a54f6ae67bdb22e84642a9e4b
Reviewed-on: http://gerrit.rockbox.org/182
Reviewed-by: Nick Peskett <rockbox@peskett.co.uk>
Tested-by: Nick Peskett <rockbox@peskett.co.uk>
---
 manual/appendix/config_file_options.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'manual/appendix/config_file_options.tex')

diff --git a/manual/appendix/config_file_options.tex b/manual/appendix/config_file_options.tex
index 3db416ecfa..59148e15cc 100644
--- a/manual/appendix/config_file_options.tex
+++ b/manual/appendix/config_file_options.tex
@@ -145,6 +145,7 @@
     cuesheet support
                     & on, off           & N/A\\
     folder navigation & off, on, random & N/A\\
+    constrain next folder & off, on     & N/A\\
     gather runtime data & off, on       & N/A\\
     \opt{usb_charging_enable}{
       usb charging  & on, off, force    & N/A\\
-- 
cgit v1.2.3

