From 4f897653dab2580cb3b7ee2a7cc22b4145ebbe68 Mon Sep 17 00:00:00 2001
From: Frank Gevaerts <frank@gevaerts.be>
Date: Fri, 15 Jan 2010 19:34:25 +0000
Subject: Differentiate between HAVE_USB_CHARGING_ENABLE and HAVE_USB_POWER for
 the manual. This is what r24005 probably should have been

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@24238 a1c6a512-1295-4272-9138-f99709370657
---
 manual/appendix/config_file_options.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'manual/appendix/config_file_options.tex')

diff --git a/manual/appendix/config_file_options.tex b/manual/appendix/config_file_options.tex
index ce95a54a0d..7be265dd56 100644
--- a/manual/appendix/config_file_options.tex
+++ b/manual/appendix/config_file_options.tex
@@ -134,7 +134,7 @@
                     & on, off           & N/A\\
     folder navigation & off, on, random & N/A\\
     gather runtime data & off, on       & N/A\\
-    \opt{usb_charging}{
+    \opt{usb_charging_enable}{
       usb charging  & on, off           & N/A\\
     }
     skip length     & outro, track, 1s, 2s, 3s, 5s, 7s, 10s, 15s, 20s, 1min,
-- 
cgit v1.2.3

