From 9723cb7fb1020c2aeb2cf36d611a31c43bf0dfc6 Mon Sep 17 00:00:00 2001
From: Dominik Riebeling <Dominik.Riebeling@gmail.com>
Date: Sun, 17 Sep 2006 20:47:10 +0000
Subject: Rework the config file options table: allow the fields to break
 automatically, reformat the source for better readability and adjust table
 width. Finally include the table in the HTML output.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@10982 a1c6a512-1295-4272-9138-f99709370657
---
 manual/appendix/appendix.tex | 4 +---
 1 file changed, 1 insertion(+), 3 deletions(-)

(limited to 'manual/appendix/appendix.tex')

diff --git a/manual/appendix/appendix.tex b/manual/appendix/appendix.tex
index a5b9083b06..c41c5f4df0 100644
--- a/manual/appendix/appendix.tex
+++ b/manual/appendix/appendix.tex
@@ -5,9 +5,7 @@
 
 \input{appendix/wps_tags.tex}
 
-\chapter{\label{ref:config_file_options}Config file options}
-\ifpdfoutput{\input{appendix/config_file_options.tex}}
-{\fixme{The config file options are omitted in the HTML version of the manual for now.}}
+\input{appendix/config_file_options.tex}
 
 \chapter{User feedback}\label{sec:feedback}
 \section{Bug reports}
-- 
cgit v1.2.3

