From 72e9b610616f2969b100d501ab4f15ab5aecdd27 Mon Sep 17 00:00:00 2001
From: Solomon Peachy <pizza@shaftnet.org>
Date: Sat, 12 Dec 2020 23:08:16 -0500
Subject: manual:  Replace all rockbox.org urls with https.

In the process, utilize the \download{} and \wikilink{} commands instead
of direct URLs.

Change-Id: Iad38c15c7b9cec95b6c011fd0dbdbb3326985bbc
---
 manual/appendix/appendix.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'manual/appendix/appendix.tex')

diff --git a/manual/appendix/appendix.tex b/manual/appendix/appendix.tex
index 1ce4eef7c9..052fd1d0d5 100644
--- a/manual/appendix/appendix.tex
+++ b/manual/appendix/appendix.tex
@@ -18,7 +18,7 @@ please file a bug report on our web page. Do not report missing
 features as bugs, instead file them as feature ideas (see below).
 
 For open bug reports refer to
-\url{http://www.rockbox.org/tracker/index.php?type=2}
+\url{https://www.rockbox.org/tracker/index.php?type=2}
 
 \subsection{Rules for submitting new bug reports}
 
@@ -39,7 +39,7 @@ files etc. (IMPORTANT!)
 
 \section{Feature ideas}
 To suggest an idea for a feature or to read those made by others, see
-\url{http://forums.rockbox.org/index.php?board=49.0}.  Please keep in
+\url{https://forums.rockbox.org/index.php?board=49.0}.  Please keep in
 mind that this forum is for the discussion of feature ideas -- they are not
  requests and there is no guarantee they will be acted upon.
 
-- 
cgit v1.2.3

