From 54c1c770cba3118a4f6c3a783eafcd8b5a3f62a1 Mon Sep 17 00:00:00 2001
From: Frank Gevaerts <frank@gevaerts.be>
Date: Sun, 21 Dec 2008 16:26:35 +0000
Subject: Add changelog (merge from 3.1 branch)

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@19536 a1c6a512-1295-4272-9138-f99709370657
---
 manual/appendix/appendix.tex | 4 +---
 1 file changed, 1 insertion(+), 3 deletions(-)

(limited to 'manual/appendix/appendix.tex')

diff --git a/manual/appendix/appendix.tex b/manual/appendix/appendix.tex
index 210a1a6e36..8292d972fd 100644
--- a/manual/appendix/appendix.tex
+++ b/manual/appendix/appendix.tex
@@ -115,9 +115,7 @@ The recording hardware (the MAS) does not allow us to do this
   done when connected to a host computer.
 \end{itemize}
 
-\chapter{Changelog}
-\section{What is new since v2.5?}
-Changes in version 3.0
+\input{appendix/changelog.tex}
 
 \chapter{Credits}
 People that have contributed to the project, one way or another. Friends!
-- 
cgit v1.2.3

