From 53ca97cbcc1014e51f5f6f48d4b71ba434b34a8c Mon Sep 17 00:00:00 2001
From: Dominik Riebeling <Dominik.Riebeling@gmail.com>
Date: Thu, 20 Jul 2006 18:12:17 +0000
Subject: Remove "config file options" from the HTML manual for now as it
 breaks building. Needs to be fixed later.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@10266 a1c6a512-1295-4272-9138-f99709370657
---
 manual/appendix/appendix.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'manual/appendix/appendix.tex')

diff --git a/manual/appendix/appendix.tex b/manual/appendix/appendix.tex
index e74a74f779..5144590796 100644
--- a/manual/appendix/appendix.tex
+++ b/manual/appendix/appendix.tex
@@ -52,7 +52,8 @@
 \input{appendix/wps_tags.tex}
 
 \chapter{\label{ref:config_file_options}Config file options}
-\input{appendix/config_file_options.tex}
+\ifpdfoutput{\input{appendix/config_file_options.tex}}
+{\fixme{The config file options are omitted in the HTML version of the manual for now.}}
 
 \chapter{LCD Screen Sizes}
 \begin{center}
-- 
cgit v1.2.3

