From c479b9975d90de77c8471c91d0d3db8513100add Mon Sep 17 00:00:00 2001
From: Thom Johansen <thomj@rockbox.org>
Date: Wed, 13 Feb 2008 13:32:44 +0000
Subject: FS #8340 by David Bishop. Remove contractions from the manual, as
 this seems to be common practice in this format and makes it easier to read
 for non-native english speakers. New manual work should try to adhere to
 this.

git-svn-id: svn://svn.rockbox.org/rockbox/trunk@16302 a1c6a512-1295-4272-9138-f99709370657
---
 manual/advanced_topics/main.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'manual/advanced_topics/main.tex')

diff --git a/manual/advanced_topics/main.tex b/manual/advanced_topics/main.tex
index 7d2909d6ab..ae50eb9527 100644
--- a/manual/advanced_topics/main.tex
+++ b/manual/advanced_topics/main.tex
@@ -380,7 +380,7 @@ Example of a configuration file:
   When your \dap{} powers on, it loads the Archos firmware in ROM, which
   automatically checks your \daps{} root directory for a file named 
   \firmwarefilename. Note that Archos firmware can only read the first 
-  ten characters of each filename in this process, so don't rename your old 
+  ten characters of each filename in this process, so do not rename your old 
   firmware files with names like \firmwarefilename.\fname{old} and so on, 
   because it is possible that the \dap{} will load a file other than the one 
   you intended.
@@ -398,6 +398,6 @@ You just ``play'' a file with the extension %
 This can be used to test new firmware versions without deleting your
 current version.
 
-\opt{gigabeat}{\note{This feature doesn't work on the gigabeat currently.}}
+\opt{gigabeat}{\note{This feature does not work on the gigabeat currently.}}
 
 \opt{archos}{\input{advanced_topics/archos-flashing.tex}}
-- 
cgit v1.2.3

